Figure 3.1: Here you enter your command for printing PostScript files.

Figure 6.1: The File Selector

Figure 6.2: You selected a file of the wrong type in the File Selector

Figure 6.3: Note that GE Signa 5.x & LX have distinct buttons.

Figure 6.4: The Control Parameters Window

Figure 6.5: The instructions-part of the File Selector for the unsuppressed water reference.

Figure 7.1: The Install License Window

Figure 7.2: The Control Parameters Window

Figure 7.3: You get this menu when you click the “Save File Types” button in Fig. 7.2.

Figure 7.4: The window for permanently reconfiguring the structure of the archive directories.

Figure 7.5: You get this menu when you click the “Advanced Settings” button in Fig. 7.2 .

Figure 7.6: You can view, edit, delete or add all Control Parameters here.

Figure 7.7: You can save all the Control Parameters, including your modifications, for optional use as starting defaults in the future.

Figure 7.8: Here you enter a name for the file which will store your Control Parameters for optional future use.

Figure 7.9: Here you select the Control-Defaults file to be used now and in the future.

Figure 7.10: Here you can set and execute your commands for printing and/or plotting previews of your data.

Figure 7.11: Here you can view and/or change the Execution Script that will be started by LCMgui.

Figure 7.12: Here you can view and/or change the Preprocessor that will be used by LCMgui.