Figure 21: Surface of the cranium for a Crouzon syndrome (58K vertices and 120K triangles)

extracted from a 256 by 256 by 135 CT scan. Before simpli�cation, the original number of

triangles was 1460K (12 times compressed). The maximum error bound is 1.0 millimeter.

Sharp ridges appear in red, and relatively at areas appear in blue, color-coded relatively to

the magnitude of the highest principal curvature (see section 3.3.)