Figure 19: Visualization of the triangular mesh for the model of Fig. 18.

Figure 20: Cortical surface of the brain for a normal individual (31K vertices and 62K tri-

angles), extracted from a 256 by 256 by 130 MR scan. Before simpli�cation, the original

number of triangles was 370K. Some important anatomical structures stand out, such as the

Inter-Hemispheral Fissure, the Temporal Lobe, the Rolandic Fissure and the Middle Temporal

Sulcus.